From dfcad777da36002f9ec6350d7a7a07ebf4a1ada6 Mon Sep 17 00:00:00 2001
From: eug-vs <eug-vs@keemail.me>
Date: Sat, 24 Apr 2021 20:05:19 +0300
Subject: feat!: remove Page loading spinner

---
 src/lib/ServiceList.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/lib/ServiceList.tsx')

diff --git a/src/lib/ServiceList.tsx b/src/lib/ServiceList.tsx
index 21b6077..473cb4c 100644
--- a/src/lib/ServiceList.tsx
+++ b/src/lib/ServiceList.tsx
@@ -37,7 +37,6 @@ const ServiceList: React.FC = () => {
   return (
     <Page
       title={service.name}
-      isValidating={isValidating}
       actions={actions}
       filters={filters}
     >
-- 
cgit v1.2.3

