From eeb3bcec19b15e6b7d30f983c8f613dedb1a9b32 Mon Sep 17 00:00:00 2001
From: eug-vs <eugene@eug-vs.xyz>
Date: Sat, 22 Oct 2022 20:06:01 +0300
Subject: refactor: separate Nginx adapter

---
 src/pages/_app.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/pages/_app.tsx')

diff --git a/src/pages/_app.tsx b/src/pages/_app.tsx
index ba9372f..18692df 100644
--- a/src/pages/_app.tsx
+++ b/src/pages/_app.tsx
@@ -7,7 +7,7 @@ function MyApp({ Component, pageProps }: AppProps) {
   return (
     <>
       <a href="/" style={{ display: 'flex', flexDirection: 'column', alignItems: 'center', textDecoration: 'none', marginBottom: '12px' }}>
-        <Image src={logo} width={128} height={128} />
+        <Image src={logo} width={128} height={128} alt="logo" />
         <h1>{"Eugene's Space"}</h1>
       </a>
       <Component {...pageProps} />
-- 
cgit v1.2.3

