From e491abb55723ab20a36ead83320e40627cca8e06 Mon Sep 17 00:00:00 2001
From: eug-vs <eug-vs@keemail.me>
Date: Fri, 3 Apr 2020 03:37:31 +0300
Subject: fix: correct linting errors :rotating_light:

---
 src/index.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/index.tsx')

diff --git a/src/index.tsx b/src/index.tsx
index 9678beb..6646cf0 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -90,7 +90,7 @@ const App: React.FC = () => {
               primary
             </Button>
           </ContentSection>
-          <Markdown url='https://raw.githubusercontent.com/eug-vs/react-benzin/develop/README.md' />
+          <Markdown url="https://raw.githubusercontent.com/eug-vs/react-benzin/develop/README.md" />
         </div>
       </Window>
       <Window type="secondary" name="SmartList preview window">
-- 
cgit v1.2.3

