From 86b09f910a44502a7d7b1e14b50b2f02158dfb39 Mon Sep 17 00:00:00 2001
From: eug-vs <eug-vs@keemail.me>
Date: Fri, 3 Jul 2020 23:42:32 +0300
Subject: feat: lower the height of polls

---
 src/components/Feed/Feed.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/Feed/Feed.tsx')

diff --git a/src/components/Feed/Feed.tsx b/src/components/Feed/Feed.tsx
index 5814711..afa914d 100644
--- a/src/components/Feed/Feed.tsx
+++ b/src/components/Feed/Feed.tsx
@@ -42,7 +42,7 @@ const Feed: React.FC<PropTypes> = ({ polls }) => {
                 isScrolling={isScrolling}
                 onScroll={onChildScroll}
                 rowCount={polls.length}
-                rowHeight={600}
+                rowHeight={550}
                 rowRenderer={RenderItem}
                 scrollTop={scrollTop}
                 width={width}
-- 
cgit v1.2.3

